/* $Id: site.def,v 1.9 2002/04/26 14:46:04 mclareni Exp $
 *
 * $Log: site.def,v $
 * Revision 1.9  2002/04/26 14:46:04  mclareni
 * Do not use shift by default, mainly for non CERN builds
 *
 * Revision 1.8  1997/02/28 10:39:53  gunter
 * mods for WNT
 *
 * Revision 1.7  1996/11/13 13:19:39  cernlib
 * Allow to veto setting of CERNLIB_SHIFT in any .cf file by defining it as false.
 *
 * Revision 1.6  1996/05/01 11:54:43  gunter
 * Introduce new way of building libraries.
 * CVS:----------------------------------------------------------------------
 *
 * Revision 1.5  1996/03/13 08:53:57  cernlib
 * Typo corrected
 *
 * Revision 1.4  1996/03/12 17:10:17  cernlib
 * #define CERNLIB_SHIFT on UNIX; this will turn on the use of shift sofware
 *
 * Revision 1.3  1996/03/06 11:04:21  cernlib
 * Imake.tmpl : Correct rule to run kuipc
 * fortran.rules: echo makedepend
 * site.def: undef MakeCmd before #define ( Sun has this defined to ..openwin...)
 * *.cf : small mods
 *
 * Revision 1.2  1995/12/21  11:32:37  cernlib
 * Imake files end 1995
 *
 * Revision 1.1.1.1  1995/12/20  15:26:44  cernlib
 * X11R6 config files unmodified
 *
 *
 */
XCOMM site:  $XConsortium: site.sample,v 1.9 94/04/08 17:02:06 rws Exp $

/*****************************************************************************
 *                                                                           *
 *			   SITE-SPECIFIC DEFINITIONS                         *
 *                                                                           *
 * This file contains two halves, one included before the vendor-specific    *
 * configuration file (.cf file), and one included after the .cf file.       *
 * The before-half should be protected by #ifdef BeforeVendorCF, and the     *
 * after-half should be protected by #ifdef AfterVendorCF.                   *
 *                                                                           *
 * The before-half should only set things that the .cf file depends on.      *
 * For the .cf files shipped in this release, the main variables in this     *
 * category are HasGcc and HasGcc2.                                          *
 *                                                                           *
 * The after-half should contain all other definitions.  For example,        *
 * place your ProjectRoot definition here.                                   *
 *                                                                           *
 * OS Major and Minor version numbers should be changed directly in the .cf  *
 * file, not overridden in site.def.                                         *
 *                                                                           *
 *****************************************************************************/

/* if you want host-specific customization, this is one way to do it */
/*
#ifndef SiteIConfigFiles
#define SiteIConfigFiles $(IRULESRC)/host.def
#define LocalConfigFiles host.def
#endif

*/


#ifdef BeforeVendorCF

#define HasFortran YES

/*
#include <host.def>
*/

/*
#ifndef HasGcc2
#define HasGcc2 YES
#endif
*/

#endif /* BeforeVendorCF */

#ifdef AfterVendorCF

#define ProjectRoot $(CVSCOSRC)

#ifndef UseXargs
#define UseXargs YES
#endif

#ifndef XargsCmd
#define XargsCmd /usr/local/bin/gxargs
#endif

/*  define CERNLIB_SHIFT to turn on using shift software */
/*   if it is already defined and false, undef it! */
/* do not use shift by default
#if defined(CERNLIB_UNIX) && !defined(CERNLIB_WINNT)
#if ! defined(CERNLIB_SHIFT)
#define CERNLIB_SHIFT
#elif  ! CERNLIB_SHIFT
#undef CERNLIB_SHIFT
#endif
#endif
   */

/* gmake does like ConstructMFLAGS to be YES(?) */
#undef MakeCmd
#ifndef WIN32
# define MakeCmd gmake
#else
# define MakeCmd make
#endif
#define ConstructMFLAGS	YES

#ifndef WIN32
# define LocalRulesFile <fortran.rules>
#else
# undef  LocalRulesFile 
#endif

/* #define HasXdmAuth YES */

/* #define BuildXKB YES */

/* #define PreIncDir /usr/local/lib/gcc-lib/sparc-sun-sunos4.1.3/2.5.8/include */

/*
#if defined(SunArchitecture) && defined(SparcArchitecture)
#define HasCodeCenter	YES
#ifndef SVR4
#define HasTestCenter	YES
#endif
#endif
*/

/*
#ifdef __hp9000s800
#define HasCodeCenter	YES
#endif
*/

/*
#if defined(SunArchitecture) && defined(SparcArchitecture) && !defined(SVR4)
#define HasPurify	YES
#endif
*/

/*
#define HasSentinel	YES
*/

/*
#if XsvgaServer
#define SvgaConfig vga.pmi:1024x768
#endif
*/

/* You do NOT need SetUID if you only run the server under xdm */
/* You MAY need SetUID if users run the server by hand or under xinit */
/* Consult your system administrator before making the X server setuid */
/*
#if defined(SunArchitecture) && OSMajorVersion > 4
#define InstallXserverSetUID YES
#endif
*/

/* You do NOT need SetUID if you only run the server under xdm */
/* You MAY need SetUID if users run the server by hand or under xinit */
/* Consult your system administrator before making the X server setuid */
/*
#if XsvgaServer
#define SvgaConfig vga.pmi:1024x768
#define InstallXserverSetUID YES
#endif
*/

/* You do NOT need SetUID if you only run the server under xdm */
/* You MAY need SetUID if users run the server by hand or under xinit */
/* Consult your system administrator before making the X server setuid */
/*
#ifdef XFree86Version
#define InstallXserverSetUID YES
#endif
*/

/*
#include <host.def>
*/

#endif /* AfterVendorCF */
